Page 99 Test

The book has been featured at the Page 99 Test. The idea is that the author opens the book to page 99 and talks about what the material on that page says about the book as a whole.

Here is a little preview:

So imagine my delight at applying the Page 99 Test and finding a full page about vomit and toilet facilities. Among the lovely phrases found on my page 99 are "sick to our stomachs," "nauseating stench," "residue of caustic GI soap lather," "a not too peaceful crap," "vomit covered the floors and fixtures," and "cold sea-water douche." Well.

It could be worse—page 99 might have been one of those blank pages in between chapters. Then I would have had to ramble about the irony of the meaninglessness of war, since my book was an attempt to find a larger meaning in World War II. Instead, I got “a not too peaceful crap.” So let’s talk about what that means.